0 1 2 3 4 5 6 7 8 9 10 0 5 10 15 20 25 30 Temperature Berlin Tegel 20060227 130

Temp frequency

11 11.5 12 12.5 13 13.5 14 0 10 20 30 40 50 60 70 Temperature Berlin Tegel 20060603 92

Temp

8 8.5 9 9.5 10 10.5 11 11.5 12 0

5

10

15

20 Temperature Berlin Tegel 20060604 53

Temp